Klein 935DAG Power Equipment – High Performance Solution (Jamaica Ready)

About this item

VERSATILE DIGITAL ANGLE GAUGE AND LEVEL: Measure angles, check relative angles with zero calibration feature, or use as a digital level with ease

HIGH VISIBILITY AND AUTO-ROTATING DISPLAY: Reverse contrast display improves visibility in low light conditions and automatically rotates when upside-down for easy viewing

STRONG MAGNETIC BASE: Attach to ferromagnetic surfaces like pipe, electrical conduit, miter saw blades for woodworking, vents, ducts, and more for convenient hands-free operation

V-GROOVE EDGES: Ensure optimal alignment on conduits and pipes for bending and alignment tasks

WIDE MEASUREMENT RANGE: Measure between 0-90, or 0-180 degrees – useful when accounting for springback when bending conduit

WATER AND DUST RESISTANT: IP42 rating provides resistance against water and dust for durability

PORTABLE AND READY TO USE: Includes soft carrying case and two AAA batteries for convenience, making it a handy magnetic level for various applications

› See more product details

The Klein Tools Digital Angle Gauge and Level can measure or set angles, check relative angles, or can be used as a digital level. The strong magnetic base attaches to ferromagnetic surfaces such as conduit. Along with dual measurement ranges of 0 to 90-Degree and 0 to 180-Degree, this tool has a high visibility reverse contrast display for easy viewing. For more than 160 years, Klein Tools has manufactured premium-quality, professional-grade hand tools that deliver the performance, durability and precision needed to get the job done right. Our family of engineers, workers and craftsman continue to put six generations of expertise into every tool we create by using only the highest quality materials, superior workmanship, and keeping manufacturing as close to home as we can. Klein isn’t just the name of our company, it’s also our family name. And since we’re an American company that’s family-owned and family-run, you know you can count on us to be here tomorrow. Klein Tools doesn’t just make great products, we make great products that stand up to the demands of the professionals who use them every day … Since 1857.

Product Specifications

Brand Name | KLEIN TOOLS
UPC | 092644692376
Global Trade Identification Number | 00092644692376
Manufacturer | Klein Tools

Customer Reviews

4.8 4.8 out of 5 stars

(16,032)

var dpAcrHasRegisteredArcLinkClickAction;
P.when(‘A’, ‘ready’).execute(function(A) {
if (dpAcrHasRegisteredArcLinkClickAction !== true) {
dpAcrHasRegisteredArcLinkClickAction = true;
A.declarative(
‘acrLink-click-metrics’, ‘click’,
{ “allowLinkDefault”: true },
function (event) {
if (window.ue) {
ue.count(“acrLinkClickCount”, (ue.count(“acrLinkClickCount”) || 0) + 1);
}
}
);
}
});

P.when(‘A’, ‘cf’).execute(function(A) {
A.declarative(‘acrStarsLink-click-metrics’, ‘click’, { “allowLinkDefault” : true }, function(event){
if(window.ue) {
ue.count(“acrStarsLinkWithPopoverClickCount”, (ue.count(“acrStarsLinkWithPopoverClickCount”) || 0) + 1);
}
});
});

4.8 out of 5 stars

ASIN | B07ZWW3BW5
Item Type Name | Klein Tools 935DAG Digital Electronic Level and Angle Gauge, Measures 0 – 90 and 0 – 180 Degree Ranges, Measures and Sets Angles
Included Components | Soft Carrying Case, Instruction Manual, Batteries
Item Height | 1.2 inches
Unit Count | 1.0 Count
Manufacturer Warranty Description | 1 Year Manufacturer
Color | Multi
Style Name | Gauge / Level
Item Dimensions L x W | 2.36″L x 2.2″W
Item Weight | 3.5 Ounces
Material Type | ABS Plastic Housing and Electronic Components
Operation Mode | Automatic
Feature | VERSATILE DIGITAL ANGLE GAUGE AND LEVEL: Measure angles, check relative angles with zero calibration feature, or use as a digital level with ease
Feature | HIGH VISIBILITY AND AUTO-ROTATING DISPLAY: Reverse contrast display improves visibility in low light conditions and automatically rotates when upside-down for easy viewing
Feature | STRONG MAGNETIC BASE: Attach to ferromagnetic surfaces like pipe, electrical conduit, miter saw blades for woodworking, vents, ducts, and more for convenient hands-free operation
Feature | V-GROOVE EDGES: Ensure optimal alignment on conduits and pipes for bending and alignment tasks
Feature | WIDE MEASUREMENT RANGE: Measure between 0-90, or 0-180 degrees – useful when accounting for springback when bending conduit
Feature | WATER AND DUST RESISTANT: IP42 rating provides resistance against water and dust for durability
Feature | PORTABLE AND READY TO USE: Includes soft carrying case and two AAA batteries for convenience, making it a handy magnetic level for various applications

Product Tags

KleinTools935DAGDigitalElectronicLevelAngleGauge,MeasuresDegreeRanges,MeasuresSetsAnglestechvett

Product Gallery

The post Klein 935DAG Power Equipment – High Performance Solution (Jamaica Ready) appeared first on Techvett Building Solutions.